Center at RA 10 33 34.02460 DEC 07 11 26.1220

CONT: 1033+071 IPOL 8452.400 MHZ 1033+071.ICLN.3

Cont peak flux = 1.9053E-01 JY/BEAM Levs = 5.5984E-04 * ( -2.00, -1.00, 1.000, 2.000, 4.000, 8.000, 16.00, 32.00, 64.00, 128.0, 256.0)

ARC SEC

ARC SEC

2 1 0 -1 -2

1.5

1.0

.5

.0

-.5

-1.0

-1.5

-2.0

-2.5