Center at RA 02 21 5.48300 DEC 35 56 13.7800

0218+357 IPOL 15359.490 MHZ 0218UN2CM.ICLN 1.1

PLot file version 1 created 03-NOV-1994 19:25:16

Peak flux = 1.3082E-01 JY/BEAM Levs = 1.5000E-03 * ( -2.00, -1.00, 1.000, 2.000, 4.000, 8.000, 16.00, 32.00, 64.00, 128.0, 256.0, 512.0)

MilliARC SEC

MilliARC SEC

314 313 312 311 310 309 308 307 306

131

130

129

128

127

126

125

124