Center at RA 02 21 5.48900 DEC 35 56 13.8200

0218+357 IPOL 1666.990 MHZ 0218_18CM.ICLN.7

PLot file version 1 created 01-FEB-1995 21:30:47

Peak flux = 6.7318E-02 JY/BEAM Levs = 5.2904E-04 * ( -2.00, -1.00, 1.000, 2.000, 4.000, 8.000, 16.00, 32.00, 64.00, 128.0)

MilliARC SEC

MilliARC SEC

300 250 200 150 100 50 0 -50

150

100

50

0

-50