Center at RA 01 31 13.49400 DEC 43 58 12.8050

BOTH: B0128+43 RR 8420.474 MHZ B0128+437.RCL002.4

Grey scale flux range= -320.7 387.0 MicroJY/BEAM Cont peak flux = 3.8705E-04 JY/BEAM Levs = 2.250E-04 * (-1, 1, 2, 4, 8, 16, 32, 64, 128, 256, 512) -200 0 200

MilliARC SEC

MilliARC SEC

-190 -195 -200 -205 -210 -215 -220

230225220215210205200